[a.u.] ψJ/N

2− 0 2 0 0.1 0.2 0.3^{< 2.0 GeV/c} T 0.0 < p

Helicity Frame

2− 0 2 0 0.1 0.2 0.3^{< 4.0 GeV/c} T 2.0 < p

2− 0 2 0 0.1 0.2 0.3^{< 6.0 GeV/c} T 4.0 < p

2− 0 2 0 0.1 0.2 0.3^{< 8.0 GeV/c} T 6.0 < p

2− 0 2 0 0.1 0.2 0.3^{< 14.0 GeV/c} T 8.0 < p

[a.u.] ψJ/N

2− 0 2 0 0.1 0.2 0.3 Collins-Soper Frame

2− 0 2 0 0.1 0.2 0.3

2− 0 2 0 0.1 0.2 0.3

2− 0 2 0 0.1 0.2 0.3 Raw data Default fit

2− 0 2 0 0.1 0.2 0.3 = +1_ϕλ = -1 ϕλ

ϕ