(GeV/c) Tp 0 5 10

invλ

1− 0 1 2 3^{, HX, |y|<1.0-e+e→ψJ/}_{, CS, |y|<1.0-e+e→ψJ/}

, HX, |y|<0.5

-μ^+μ →ψJ/ , CS, |y|<0.5

-μ^+μ →ψJ/ CGC+NRQCD, |y|<1.0 CGC+NRQCD, |y|<0.5

STAR = 200 GeV s p+p