)c (GeV/

reco T, jet p 30− 20− 10− 0 10 20 30 40 50

)c (GeV/ det T, jet p

0 5 10 15 20 25 30 35 40 45 50 RM Tpδ

4−10

3−10

2−10

= 200 GeV NNs Au+Au Central (0-10%) c = 5 GeV/ min T,lead p , R = 0.3 Tk anti-