0

5

10

) [pb/deg]

+π(^{CS}ϕ/dσd

= 200 GeV sp'+^-π^+π+p'

→p+p

STAR

) > 1.5 GeV

-π^+π m(

180 - 60

- 60 180 )^+π(^{CS}ϕ 0.5 1 1.5

MC(norm.)/Data