10^{-1}

1

10

25 30 35 40 45 50 55 60 65

NLO pQCD calc.

Data 3.4ΛηΛ4.0

π^0 mesons (〈η〉=3.8)

E_π (GeV)

E d^3σ/dp^3 (μb c^3/GeV^2)

KKP F.F. (η=3.8) Kretzer F.F. (η=3.8)

Normalization Uncertainty = 17Ψ

〈p_T〉 = 1.5 1.7 1.9 2.1 2.2 GeV/c