s [GeV] √ 10^210^310^410

(red) [mb] totσ

(blue),

inelσ

(green), elσ

0 20 40 60 80 100 120 140^{(PDG 2018)} pp (PDG 2018) pp =200 GeV) s (pp at

STAR fits by COMPETE (model RRPL2u) totσ

fits by authors (pp data only) inσ _{el}σ