[GeV] s 10^210^310^410

] ^{-2}

[GeV el B

10 12 14 16 18 20 22 24^{pp}_p

=200 GeV) s (pp at

STAR < 30 TeV) s = 7.60 + 0.66 * log(s) (pp, EL linear fit B