0.05 0.06 0.07 0.08 0.09 0.1 0.11 0.12 0.13 ]^2

|t| [GeV 10

210

] ^2

/dt [mb/GeV elσd

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 =200 GeV s STAR pp at

|t| )⋅ exp(-B

⋅ _{t=0}|dt^{el} σd = dt elσd Fit

Acceptance s =

]^{-2}

0.09 [GeV ± B = 14.32

]^2

1.19 [mb/GeV ± = 155.38

t=0|_{dt}^{elσd}

/NDF = 24.5/ 34 (0.88) 2χ

0.05 0.06 0.07 0.08 0.09 0.1 0.11 0.12 0.13 ]^2

|t| [GeV

0.05 - 0 0.05

Fit Data-Fit