2- 1.5- 1- 0.5- 0 0.5 1 1.5 2 [mrad] θΔ 6-10

5-10

4-10

3-10

2-10

1-10

EVT P

0.01% ± 0.04

(4PT,GEO) sample DATA G4MC BCKG BCKG within cut