[deg] ϕ 150 - 100- 50- 0 50 100 150

] ^2

|t| [GeV

0.05

0.1

0.15

0.2

0.25

2-10

1-10

1 Fit t-range GEO limits

DATA [4PT,COL]

EUWD EDWU