h_InvMass_0

Entries 9803763 Mean 1.121 Std Dev 0.01926

)^2

) (GeV/c -π Inv. mass (p,

1.08 1.1 1.121.141.161.18

Counts

0 500 1000

1500

2000

2500

3000^310× h_InvMass_0_{Entries 9803763} Λ (a)

h_InvMass_1

Entries 5521617 Mean 1.122 Std Dev 0.01964

)^2

) (GeV/c

+π,p

Inv. mass (

1.08 1.1 1.121.141.161.18

Λ (b) 62.4 GeV Au + Au collisions at STAR (GeV/c) < 2.0 T 0.9 < p |y| < 0.5 Minimum bias