]^2

Invariant Mass [GeV/c

1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95 2 2.05 2.1

)^2 Counts/(10 MeV/c

0 100 200 300 400 500 600 700 800 900 Unlike-Sign

Normalized Like-Sign

Residual Linear BG Fit

< 10 GeV/c

T p^0

2 < D

50-80% Centrality

]^2

Invariant Mass [GeV/c

1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95 2 2.05 2.1

)^2 Counts/(10 MeV/c

-100 0 100 200 300 400 500 600 700 800 US - (LS + Lin. BG)

= 43.43 S+B S

]^2

Invariant Mass [GeV/c

1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95 2 2.05 2.1

)^2 Counts/(10 MeV/c

0 1000

2000

3000

4000

5000

6000

7000

< 10 GeV/c

T p^0

2 < D

20-50% Centrality

]^2

Invariant Mass [GeV/c

1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95 2 2.05 2.1

)^2

Counts/(10 MeV/c

0 1000

2000

3000

4000

5000

6000 = 112.32 S+B S

]^2

Invariant Mass [GeV/c

1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95 2 2.05 2.1

)^2 Counts/(10 MeV/c

0 2000

4000

6000

8000

10000

12000

< 10 GeV/c

T p^0

2 < D

0-20% Centrality

]^2

Invariant Mass [GeV/c

1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95 2 2.05 2.1

)^2

Counts/(10 MeV/c

0 2000

4000

6000

8000

10000 = 119.02 S+B S