2.1 2.2 2.3 2.4 2.5 )^2c

(GeV/ π pKM 0

50

100

150

)^2c Counts/(10 MeV/

(b) 10-80% c < 6.0 GeV/ Tp 3.0 < 21 ± ) = 215 cΛ#(

2.1 2.2 2.3 2.4 2.5 )^2c

(GeV/ π pKM 0

50

100

)^2c Counts/(10 MeV/

-π^+Kp + ^+π^-pK wrong-sign

= 200 GeV NNs Au+Au,

(a) 0-20% c < 6.0 GeV/ Tp 3.0 < STAR 17 ± ) = 104 cΛ#(