)^4/c^2

(GeV 2m 0.2 − 0 0.2 0.4 0.6 0.8 1 1.2

Counts

1 10 210 310 410 510 610 : 0.50 - 0.60 (GeV/c) Tp π K p

Au+Au 14.5 GeV (0-5%)