/ ndf 2 χ 3901 / 173 π 1.033e+03± 1.067e+06 e 2.300e+02± 4.688e+04 K 2.096e+02± 4.413e+04 p 2.256e+02± 5.042e+04 ,e_πσ 0.00005 ± 0.07654 )π(σd 0.00008±0.09067− -e) π(σd 0.0005± 0.3336 (e-K) σd 0.0006± 0.6029 (K-p) σd 0.001± 1.022 K σ 0.00034 ± 0.09344 pσ 0.00028 ± 0.09947

πz 0.5 − 0 0.5 1 1.5 2 2.5

Counts

1 10 210 310 410 510 610 Au+Au 14.5 GeV (0-5%) π e K p

: 0.30 - 0.35 (GeV/c) Tp