0 1 2 3 4 5 6

rec. efficiency × Acc.

3−10

2−10

1−10

1 |<0.5y = 39 GeV Au+Au, | NNs STAR,

Central: Ω/Ξ/Λ/_S^0

0-5% for K ϕ 0-10% for

1 2 3 4 5 6

3−10

2−10

1−10

1

Peripheral: 60-80% S 0K ϕ Λ_- Ξ_- Ω

)c (GeV/ Tp