10^210

π/Λ

20 40 60 80 3−10 × E891 E896 UrQMD 1.3 HSD SHM

10^210

π/Λ

4−10

3−10

2−10

PHENIX NA57 E917

10^210

π/^-Ξ

0 2 4 6 8 3−10 × NA49 STAR STAR BES

10^210

π/^+Ξ

4−10

3−10

(GeV) NNs