0 1 2 3 0

0.5

1 = 7.7 GeV NNs

1 2 3 0

0.5

1 = 11.5 GeV NNs

0 1 2 3 0

0.5

1

= 19.6 GeV NNs 1 2 3 0

0.5

1

= 27 GeV NNs

0 1 2 3 0

0.5

1

= 39 GeV NNs 1 2 3 0

0.5

1

Λ/Λ -Ξ/^+Ξ -Ω/^+Ω

STAR, central Au+Au chT/_Sμ chT/_Bμ