0 100 200 300 400

2−10

1−10

1 = 7.7 GeV NNs

100 200 300 400

2−10

1−10

1 = 11.5 GeV NNs

0 100 200 300 400

2−10

1−10

1

= 19.6 GeV NNs 100 200 300 400

2−10

1−10

1

= 27 GeV NNs

0 100 200 300 400

2−10

1−10

1

= 39 GeV NNs 100 200 300 400

2−10

1−10

1 Λ/Λ -Ξ/^+Ξ -Ω/^+Ω

|<0.5 y STAR, Au+Au, |

/B) B Ratio (

〉 _{part} N〈