)^2c

) (GeV/

-K^+

Mass (K

0.98 1 1.02 1.04 1.06 1.08 1.1 0 2 4 6 8 10 12 310 × ϕ 0.98 1 1.02 1.04 1.06 1.08 1.1 100 200 300 400 500 ×

= 7.7 GeV Au+Au (0-80%) NNs STAR, c > 0.2 GeV/ Tp | < 0.5, y|

2c Counts per 1.0 MeV/