[GeV/c] T Detector Jet p

10 20 30 40 50

T dp LL Inclusive Jet A

0.04 −

0.02 −

0

0.02_{/NDF: 11.8/13} 2χ 0.0004 ± p0: -0.0005

Not Corrected for Detector Effects