[GeV/c] T Detector Jet p

10 20 30 40 50 0.2 − 0 0.2 JP2 data

(data-simu)

0.2 − 0 0.2 JP1 0.2 − 0 0.2 JP0

Counts

310

410

510

610

710 JP0 JP1 JP2 JP0