[GeV/c] Tp 0 2 4 6 8 10 12 14 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 (a) 0-80% STAR

[GeV/c] Tp 0 2 4 6 8 10 12 14

(b) 0-20%^{Au+Au @ 200 GeV}

TM I: Tsinghua TM II: TAMU max Coll. dissociation, t min Coll. dissociation, t

[GeV/c] Tp 0 2 4 6 8 10 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 (c) 20-40%

[GeV/c] Tp 0 2 4 6 8 10

(d) 40-60%

[GeV/c] Tp 0 1 2 3 4 5 6 7 8

(e) 60-80% PHENIX: 60-92%

ψ Au+Au @ 200 GeV, Inclusive J/ , |y|< 0.5

-μ^+μ →ψ STAR: J/ Systematic uncertainty , |y|<0.35

-e^+e→ψ

PHENIX: J/ , |y|<1

-e^+e→ψ

STAR: J/

Pb+Pb @ 2.76 TeV , 0-40%, |y|<0.8 ψ ALICE: Inclusive J/ , 0-100%, |y|<2.4 ψ CMS: Prompt J/

AA R

AA R