]^2

[GeV/c

-μ^+μM

2.6 2.8 3 3.2 3.4 3.6 3.8

)^2 Counts/(40 MeV/c

0.2

0.4

0.6

0.8

1 310 ×

Unlike-sign pairs Mixed-event Combined fit -1 ~ 14.2 nb

L, ^-μ+^+μ→ψJ/ > 5 GeV/c T |y| < 0.5, p 65 ± = 1091 ψJ/N S/B = 1:2.1

Au+Au @ 200 GeV, 0-80% STAR