2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4

]^2

[GeV/c eeM 0

500

1000

1500

2000

)^2 Counts /(30 MeV/c

p+p 500 GeV -e^+e→ψJ/ | < 1 ee|y

unlike-sign like-sign )^+e^+ + e -e^-

- (e

-e^+e fit (signal + res. bg.) residual background

< 20 GeV/c ee T 4 < p

207 ± = 9581 ψJ/ N

< 12 GeV/c ee T 4 < p 89 ± = 350

(2S) ψ N

3.4 3.6 3.8 4 4.2 4.4 0 50 100 150 200