0 1 2 3 4 5 6 7 8 9 [GeV/c]

T pψ J/ 0 5 10 15 20 25 30 35 40 45 50

Relative uncertainties (%)

channel -μ^+μ→ψ p+p 510 GeV, J/ Statistical Total systematic Signal extraction TPC tracking MTD response and matching MTD trigger Muon identification Vertex finding