2.5 3 3.5 ]^2

[GeV/c μμM 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 610 ×

)^2 Weighted counts/(50 MeV/c

/ndf = 40.0/24 2χ < 1.5 GeV/c μμ T 0.0 < p

| < 0.4 μμ |y (a)

2.5 3 3.5 ]^2

[GeV/c μμM 0 0.05 0.1 0.15 0.2 0.25 0.3 610 ×

)^2

Weighted counts/(50 MeV/c

/ndf = 26.0/24 2χ < 3.0 GeV/c μμ T 1.5 < p

| < 0.4 μμ |y (b)

2.5 3 3.5 ]^2

[GeV/c μμM 0 10 20 30 40 50 60 70 80 90 310 ×

)^2

Weighted counts/(50 MeV/c

/ndf = 33.9/24 2χ < 5.0 GeV/c μμ T 3.0 < p | < 0.4 μμ |y (c)

2.5 3 3.5 ]^2

[GeV/c μμM 0 2 4 6 8 10 310 ×

)^2 Weighted counts/(50 MeV/c

/ndf = 20.9/24 2χ < 7.0 GeV/c μμ T 5.0 < p

| < 0.4 μμ |y (d)

2.5 3 3.5 ]^2

[GeV/c μμM 0 0.5 1 1.5 2 2.5 310 ×

)^2

Weighted counts/(50 MeV/c

/ndf = 17.2/19 2χ < 9.0 GeV/c μμ T 7.0 < p

| < 0.4 μμ |y (e) Opposite-sign Fit Signal Background