2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 ]^2

[GeV/c μμM 0 100 200 300 400 500 600

)^2 Counts/(50 MeV/c

/ndf = 31.0/28 2χ 54 ± = 1154 ψJ/ N data fit signal background p+p 510 GeV < 9 GeV/c μμ T 0 < p

| < 0.4 μμ |y