0.001 0.01 0.1 1 s/_T =2p Tx 310 610 910 12 10 15 10 18 10 21 10 24 10 27 10 28 10

]^2 [nb/(GeV/c) 3 /dp σ^3Ed × BR n /GeV) s(

CDF UA2 UA1 PHENIX ISR FNAL ALICE ATLAS CMS

STAR p+p 510 GeV STAR p+p 500 GeV STAR p+p 200 GeV

(n=6.6) 410 ×π

p(n=6.6)

(n=5.6) ψJ/