0 1 2 3 4 5 6 7 8 9 [GeV/c] T p 0 0.02

0.04

0.06

0.08 0.1

)ψ(J/ σd_{ψJ/} (2S)) / BR ψ(σd (2S) ψ BR

0.1)

≤_Fx≤ channel (-0.35

-e^+

HERA-B, 42 GeV e 0.1)

≤_Fx≤ channel (-0.35

-μ^+μ

HERA-B, 42 GeV PHENIX, 200 GeV (|y|<0.35) CDF, 1.8 TeV (|y|<0.6) ATLAS, 8 TeV (0.00<|y|<0.25) CMS, 7 TeV prompt (|y|<1.2) CMS, 7 TeV b feed-down (|y|<1.2) STAR, 500 GeV (|y|<1) ICEM, 500 GeV (|y|<1)