(maximum scale) T (2s) p ψ input

T pψ input J/

4 6 8 10 12 14 16 18 20 [GeV/c] T p 0

0.1

0.2

0.3

0.4

0.5

Acceptance × Efficiency

-e^+ e→ψJ/_- e^+ e → (2S) ψ (a)

4 6 8 10 12 14 16 18 20 [GeV/c] Tp 1 2 3

ψJ/ε /

(2S) ψε

(b)