0.4 − 0.2 − 0.0 0.2 0.4 0.6 0.8 1.0

(MeV)

2)c_H3_Λ - m Λ + m d = (m ΛB

Values with recalibration

STAR (2019)

NPB1(1967)

NPB4(1968)

PRD1(1970)

NPB52(1973)

H^3_Λ

H^3_Λ

H^3_Λ

H + 3 Λ

0.4 − 0.2 − 0.0 0.2 0.4 0.6 0.8 1.0

(MeV)

2)c_H3_Λ - m Λ + m d = (m ΛB

Theoretical calculation

STAR (2019)

NPB47(1972)

PRL89(2002)

PRC77(2008)

1711.07521 arXiv:

H^3_Λ

H^3_Λ

H^3_Λ

H + 3 Λ