2.5 3 3.5 4 4.5

)^4/c^2

(GeV 2m 0 2 4 6 8 310 × d (a)

2.5 3 3.5 4 4.5

)^4/c^2

(GeV 2m 0 2 4 6 8

310 × = 200 GeV (0-10%) NNs Au+Au : 2.4-2.8 GeV/c Tp

d

(b) Signal Background Signal + Background

Counts