10 100 1000

(GeV) NNs 4−10

3−10

2−10

1−10

1

Particle ratio

STAR 0-10% d/p p/d STAR 0-10%

E802 d/p NA49 d/p PHENIX d/p p/d PHENIX ALICE d/p

Thermal d/p p/d Thermal