(GeV/c) Tp 0 1 2 3 4 5

Particle Ratio

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 )/h (dAu, 200 GeV) p (p+ )/h (pp, 200 GeV) p (p+ )/h (AuAu, 130 GeV) p (p+ , 1.8 TeV) p )/h (p p (p+

(pp, 23.8 GeV) + p/h (pW, 23.8 GeV) + p/h