dAu R

0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 dAu Minbias -0.5<y<0.0 π K p

(GeV/c) Tp 0 0.5 1 1.5 2 2.5 3 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 dAu 0-20%

(PHENIX) CP Au+Au R 0π p