-2 dy) (GeV/c) T dp_Tp

-4 10 -3 10 -2 10 -1 10 1 dAu Minbias

-0.5<y<0.0

-π _- K p

dAu Minbias

-0.5<y<0.0

+π _+ K p

0 0.5 1 1.5 2 2.5 3 3.5

π N/(2 2d

-4 10 -3 10 -2 10 -1 10 1 pp NSD -0.5<y<0.0

-π _- K p (GeV/c) Tp 0 0.5 1 1.5 2 2.5 3 3.5 pp NSD

-0.5<y<0.0

+π _+ K p