Counts

1 10 10^2

10^3

380 < p < 400 MeV/c -�

-e^-K p

dE/dx [eV/cm] 112

Counts

1 10 10^2

10^{3 700 < p < 720 MeV/c} -�

-e -K p

FIG1Chagepaticlidenti �catiofocentraentat