)^2

(GeV/c πKM 1.7 1.8 1.9 2

)^2 Counts (per 10 MeV/c

0

20

40

60

310 × = 200 GeV NNs Au+Au

< 10.0 GeV/c T 0.0 < p 0-80%

(a)

)^2

(GeV/c πKM 1.7 1.8 1.9 2 0

10

20

30 310 × < 10.0 GeV/c T 0.0 < p

0-10%

US (SE) LS (SE)

(b)

)^2

(GeV/c πKM 1.7 1.8 1.9 2 0

0.5

1

1.5

2 310 × < 8.0 GeV/c T 0.0 < p

60-80%

US (ME) US(SE) - US(ME)

(c)