(GeV/c) Tp 0 2 4 6 0.5 1 1.5

0-10%

= 200 GeV |y| < 1.0 NNs Au+Au

0.021 ± 1.104

Fit : (a)

(GeV/c) T p 0 2 4 6 0.5 1 1.5

10-20% 20-40%

0.019 ± Fit : 1.071 0.015 ± Fit : 1.060 (b)

(GeV/c) Tp 0 2 4 6 0.5 1 1.5

40-60% 60-80%

0.022 ± Fit : 1.073 0.039 ± Fit : 0.943 (c)

)^0/D^0D Ratio (