(GeV/c) Tp 0 2 4 6 8 10

0.5

1

1.5 0 D LBT Duke

D ALICE 2.76 TeV

= 200 GeV 0-10% NNs Au+Au (a)

(GeV/c) Tp 0 2 4 6 8 10

0.5

1

1.5 0-12% STAR 200 GeV ±π 0-5% ALICE 2.76 TeV ±h (b)

AAR