(c) 〉β〈 0 0.1 0.2 0.3 0.4 0.5 0.6

(GeV) kinT

0

0.1

0.2

0.3 = 200 GeV NNs Au+Au

0D -Ξ,ϕ ,K,p π

60-80%

0-10%

60-80% 0-5%

70-80% 0-5%