(GeV/c) Tp 0 2 4 6 8 10

-2 dy) (GeV/c) Tdp_Tpπ2_{ev} N/(N 2d

8−10

6−10

4−10

2−10 0-10% 10-20% (/2) 20-40% (/4) 40-60% (/8) 60-80% (/16)

= 200 GeV NNs Au+Au

Blast-Wave Fit Tsallis Blast-Wave Fit