(GeV/c) Tp 0 2 4 6 8 10

Double Counting / Signal

0

0.1

0.2

0.3 60-80% 40-60% 20-40% 10-20% 0-10%

= 200 GeV NNs Au+Au

Black:[1.83, 1.91] Blue:[1.83, 1.91] - SB