1 m) μ (_{XY} σ

0

50

100

150 pp+ ±K ±π

0.2 0.5 2 3 XY (a) DCA 1 m) μ (_Zσ

pp+ ±K ±π

0.2 0.5 2 3 Z (b) DCA

= 200 GeV, 0-80% NNs Au+Au

Total Momentum p (GeV/c)