Centrality

0-10%

10-20%

20-30%

30-40%

40-50%

50-60%

60-70%

70-80% vtxε GEANT/Data-Driven Simu.

0

0.5

1

~ 2 GeV/c Tp ~ 4 GeV/c Tp

= 200 GeV NNs Au+Au