](GeV/c)

0[D_Tp

0 2 4 6 8

HFT ε× _{TPC} ε

3−10

2−10

1−10

GEANT Simu. Data-Driven Simu. (GEANT Input) (a)

= 200 GeV, 20-30% NNs Au+Au

(GeV/c) Tp 0 2 4 6 8 0.5 1 (d) (GeV/c) Tp 0 2 4 6 8

GEANT/D-D S.

0.5 1 (b) ](GeV/c) 0[D T p 0 2 4 6 8

3−10

2−10

1−10

(e)

= 200 GeV, 70-80% NNs Au+Au

](GeV/c)

0[D_Tp

0 2 4 6 8

3−10

2−10

1−10

(c)

= 200 GeV, 50-60% NNs Au+Au

(GeV/c) Tp 0 2 4 6 8 0.5 1 (f)