〉_{part} N〈 0 100 200 300 400

AA R^0 Integrated D

0

0.5

1

1.5 p+p norm.

+ X @ 200 GeV, |y|<1 0 D → STAR Au+Au

< 8.0 GeV/c T 3.0 < p < 8.0 GeV/c T 0 < p

< 2.2 GeV/c T 0.7 < p

0-80% MB