0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 *θ cos 0.4 −

0.2 −

0

0.2

0.4

raw TT D

Λ (a)

/ ndf = 6.47 / 9 2χ 0.0075 ± = 0.0131 raw TTD / ndf = 6.81 / 9 2χ 0.0075 ± = -0.0055 raw TTD

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 *θ cos

0.5 −

0

raw TTD

Λ (b)

/ ndf = 14.75 / 9 2χ 0.0069 ± = -0.0013 raw TTD / ndf = 4.33 / 9 2χ 0.0069 ± = 0.0011 raw TTD

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 *θ cos

0.2 −

0

0.2

TTδ

0 S (c) K

< 3 GeV/c Tp 2 < < 1.2 η 0 < < 0 η -1.2 <

/ ndf = 7.75 / 9 2χ 0.0051 ± = -0.0027 TTδ / ndf = 6.11 / 9 2χ 0.0051 ± = -0.0073 TTδ