1− 0.5− 0 0.5 1 * θ cos 2−

0

2

raw LLD

0.026 ± 0.010 raw LLD /ndf 28.1/19 2χ 0.026 ± 0.018 raw LLD /ndf 21.0/19 2χ Λ a)

= 0.732 α Updated with

1− 0.5− 0 0.5 1 * θ cos 2−

0

2

raw LLD

0.018 ± -0.003 raw LLD /ndf 20.8/19 2χ 0.018 ± -0.017 raw LLD /ndf 10.7/19 2χ Λ b)

= -0.732 α Updated with

1− 0.5− 0 0.5 1 * θ cos 2−

0

2

LLδ

0.014 ± 0.004 LLδ /ndf 16.8/19 2χ 0.014 ± -0.000 LLδ /ndf 11.7/19 2χ 0 S c) K

< 0 η -1.2 < < 1.2η0 <